From 67f076b151d35a36800734cb31a403fac92ffb6d Mon Sep 17 00:00:00 2001
From: Loek Le Blansch <loek@pipeframe.xyz>
Date: Fri, 21 Jun 2024 13:22:18 +0200
Subject: WIP more design document + add TODOs

---
 docs/handover.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'docs/handover.adoc')

diff --git a/docs/handover.adoc b/docs/handover.adoc
index 0e8af5a..6918256 100644
--- a/docs/handover.adoc
+++ b/docs/handover.adoc
@@ -109,7 +109,8 @@ Our project documentation was originally written in Microsoft Word, but we
 later transferred all documentation to AsciiDoc because of issues where
 OneDrive would roll back changes. If possible, use a documentation system or
 format that allows using an external version control system like Git to avoid
-losing content.
+losing content. This is also the reason why our documents may contain
+formatting/style errors.
 
 === Misconceptions
 
-- 
cgit v1.2.3

